-- ******************************************************************
-- 表 kku_transfer_apps 的创建SQL
-- 对应的Model: App\Module\Transfer\Models\TransferApp
-- 警告: 此文件由系统自动生成，禁止修改！
-- ******************************************************************

CREATE TABLE `kku_transfer_apps` (
  `id` int unsigned NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `keyname` varchar(50) COLLATE utf8mb4_unicode_ci NOT NULL COMMENT '应用标识符',
  `title` varchar(100) COLLATE utf8mb4_unicode_ci NOT NULL COMMENT '应用显示名称',
  `description` text COLLATE utf8mb4_unicode_ci COMMENT '应用描述信息',
  `out_id` int NOT NULL COMMENT '外部应用ID',
  `out_id2` int DEFAULT NULL COMMENT '外部应用ID2-开放接口',
  `out_id3` int DEFAULT NULL COMMENT '外部应用ID3-三方平台ID',
  `currency_id` int NOT NULL COMMENT '货币类型ID',
  `fund_id` int NOT NULL COMMENT '资金账户类型ID',
  `fund_to_uid` int DEFAULT NULL COMMENT '转入目标账户UID',
  `fund_in_uid` int DEFAULT NULL COMMENT '转入来源账户UID',
  `exchange_rate` decimal(10,4) NOT NULL DEFAULT '1.0000' COMMENT '汇率(钱包:业务)',
  `order_callback_url` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '结果通知API地址(为空则不通知)',
  `order_in_info_url` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '转入查询API地址(为空则不查询)',
  `order_out_create_url` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '转出创建API地址(为空则不创建)',
  `order_out_info_url` varchar(255) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '转出查询API地址(为空则不查询)',
  `is_enabled` tinyint(1) NOT NULL DEFAULT '1' COMMENT '是否启用(1=启用,0=禁用)',
  `created_at` timestamp NULL DEFAULT NULL COMMENT '创建时间',
  `updated_at` timestamp NULL DEFAULT NULL COMMENT '更新时间',
  `deleted_at` timestamp NULL DEFAULT NULL COMMENT '删除时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_keyname` (`keyname`),
  KEY `idx_out_id` (`out_id`),
  KEY `idx_currency_id` (`currency_id`),
  KEY `idx_enabled` (`is_enabled`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='划转应用配置表';
